LIBRARY
EXPORTS
	; Note: If new functions are added, the Rainmeter.lib files in Plugins\API\x32 and Plugins\API\x64
	; must be replaced by the corresponding file in Library\x32\Release and Library\x64\Release.
	RmReadString
	RmReadFormula
	RmPathToAbsolute
	RmExecute
	RmGet
	LSLog
	ReadConfigString
	PluginBridge

	; Private
	RainmeterMain		@1 NONAME
	pcre_compile		@2 NONAME
	pcre_exec			@3 NONAME
	pcre_study			@4 NONAME
