LIBRARY
EXPORTS
	; Note: If new functions are added, the Rainmeter.lib files in Plugins\API\{x32,x64} must be
	; replaced by the corresponding file in {x32,x64}-Release\Obj\Library.
	; Set '<ExcludeTests>true</ExcludeTests>' in Rainmeter.props first to minimize the .lib size.
	RmReadString
	RmReadFormula
	RmReplaceVariables
	RmPathToAbsolute
	RmExecute
	RmGet
	RmLog
	RmLogF
	LSLog
	ReadConfigString
	PluginBridge

	; Private
	RainmeterMain		@1 NONAME
	pcre_compile		@2 NONAME
	pcre_exec			@3 NONAME
	pcre_study			@4 NONAME
